% Style parameters and macros used by some documents here

% Style parameters
\raggedbottom
\sloppy
\parindent =       0mm
\parskip =         2mm

% Page style parameters for A4 (European standard paper size)
%\textwidth =      160mm
%\textheight =     240mm
%\topmargin =      -11mm

% Page style parameters for U.S. standard paper size
\textwidth =      160mm
\textheight =     220mm
\topmargin =      -11mm

\oddsidemargin =   1.5mm
\evensidemargin =  1.5mm

% Frequently used system name
\newcommand{\UNIX}{U{\sc nix}}

% Variable used by begin code command
\newlength{\codewidth}

\newcommand{\bcode}{
	% Calculate the text width for the minipage:
	\setlength{\codewidth}{\linewidth}
	\addtolength{\codewidth}{-\parindent}
	%
	\par
	\vspace{3mm}
	\indent
	\begin{minipage}[t]{\codewidth}
}

\newcommand{\ecode}{
	\end{minipage}
	\vspace{3mm}
	\par
	\noindent
}
