% Style parameters and macros used by all documents here

% Page lay-out parameters
\textwidth =      150mm
\textheight =     240mm
\topmargin =      -11mm
\oddsidemargin =    5mm
\evensidemargin =   5mm

% Macros for e.g. and E.g. if you want them italicized:
% \newcommand{\eg}{{\it e.g.}}
% \newcommand{\Eg}{{\it E.g.}}
% If you don't want them italicized:
\newcommand{\eg}{e.g.}
\newcommand{\Eg}{E.g.}

% Frequently used system names
\newcommand{\Python}{Python}
\newcommand{\UNIX}{U{\sc nix}}

% Code environment (use together with verbatim!)
\newenvironment{code}%
{\nopagebreak\begin{list}{\nopagebreak}{\nopagebreak}\nopagebreak}%
{\nopagebreak\end{list}\nopagebreak}
